\chapter{Conclusion}
\label{c:conclusion}
% Just a little knot to tie the paper together.

In the previous chapters this thesis presents the design and implementation
of \CFA's exception handling mechanism (EHM).
Both the design and implementation are based off of tools and techniques
developed for other programming languages but they were adapted to better fit
\CFA's feature set.

The resulting features cover all of the major use cases of the most popular
termination EHMs of today, along with reintroducing resumption exceptions and
creating some new features that fix with \CFA's larger programming patterns.

The implementation has been tested and compared to other implementations.
The results, while not cutting edge, are good enough for prototyping, which
is \CFA's stage of development.

This is a valuable new feature for \CFA in its own right but also serves
as a tool (and motivation) for other developments in the language.
