% Specify the document class, default style attributes, and page dimensions
% For hyperlinked PDF, suitable for viewing on a computer, use this:
\documentclass[letterpaper,12pt,titlepage,oneside,final]{book}

% For PDF, suitable for double-sided printing, change the PrintVersion variable below
% to "true" and use this \documentclass line instead of the one above:
%\documentclass[letterpaper,12pt,titlepage,openright,twoside,final]{book}

% common macros for this thesis
\input{macros}

\newcommand{\href}[1]{#1} % does nothing, but defines the command so the
% print-optimized version will ignore \href tags (redefined by hyperref pkg).

% This package allows if-then-else control structures.
\usepackage{ifthen}
\newboolean{PrintVersion}
\setboolean{PrintVersion}{false} 
% CHANGE THIS VALUE TO "true" as necessary, to improve printed results for hard copies
% by overriding some options of the hyperref package below.

\usepackage{amsmath,amssymb,amstext} % Lots of math symbols and environments
% \usepackage[pdftex]{graphicx} % For including graphics N.B. pdftex graphics driver 
\usepackage{graphicx}

\usepackage{amsthm} % for theorem environment
\newtheorem{theorem}{Theorem}

\usepackage{footmisc} % for double refs to the same footnote

\usepackage{caption} % for subfigure
\usepackage{subcaption}

% Hyperlinks make it very easy to navigate an electronic document.
% In addition, this is where you should specify the thesis title
% and author as they appear in the properties of the PDF document.
% Use the "hyperref" package 
% N.B. HYPERREF MUST BE THE LAST PACKAGE LOADED; ADD ADDITIONAL PKGS ABOVE
%\usepackage[pdftex,pagebackref=false]{hyperref} % with basic options
\usepackage[pagebackref=false]{hyperref}
% N.B. pagebackref=true provides links back from the References to the body text. This can cause trouble for printing.

\hypersetup{
	plainpages=false,       % needed if Roman numbers in frontpages
	unicode=false,          % non-Latin characters in Acrobat’s bookmarks
	pdftoolbar=true,        % show Acrobat’s toolbar?
	pdfmenubar=true,        % show Acrobat’s menu?
	pdffitwindow=false,     % window fit to page when opened
	pdfstartview={FitH},    % fits the width of the page to the window
	pdftitle={Cforall\ Type\ System\ Implementation},    % title
    pdfauthor={Aaron\ Moss}, % author
    pdfsubject={Cforall},  % subject
%    pdfkeywords={keyword1} {key2} {key3}, % list of keywords, and uncomment this line if desired
	pdfnewwindow=true,      % links in new window
	colorlinks=true,        % false: boxed links; true: colored links
	linkcolor=blue,         % color of internal links
	citecolor=green,        % color of links to bibliography
	filecolor=magenta,      % color of file links
	urlcolor=cyan           % color of external links
}
\ifthenelse{\boolean{PrintVersion}}{   % for improved print quality, change some hyperref options
\hypersetup{	% override some previously defined hyperref options
%    colorlinks,%
	citecolor=black,%
	filecolor=black,%
	linkcolor=black,%
	urlcolor=black}
}{} % end of ifthenelse (no else)

\input{cfa-macros} % must be loaded after hyperref

% \usepackage[automake,toc,abbreviations]{glossaries-extra} % Exception to the rule of hyperref being the last add-on package

% Setting up the page margins...
% uWaterloo thesis requirements specify a minimum of 1 inch (72pt) margin at the
% top, bottom, and outside page edges and a 1.125 in. (81pt) gutter
% margin (on binding side). While this is not an issue for electronic
% viewing, a PDF may be printed, and so we have the same page layout for
% both printed and electronic versions, we leave the gutter margin in.
% Set margins to minimum permitted by uWaterloo thesis regulations:
\setlength{\marginparwidth}{0pt} % width of margin notes
% N.B. If margin notes are used, you must adjust \textwidth, \marginparwidth
% and \marginparsep so that the space left between the margin notes and page
% edge is less than 15 mm (0.6 in.)
\setlength{\marginparsep}{0pt} % width of space between body text and margin notes
\setlength{\evensidemargin}{0.125in} % Adds 1/8 in. to binding side of all 
% even-numbered pages when the "twoside" printing option is selected
\setlength{\oddsidemargin}{0.125in} % Adds 1/8 in. to the left of all pages
% when "oneside" printing is selected, and to the left of all odd-numbered
% pages when "twoside" printing is selected
\setlength{\textwidth}{6.375in} % assuming US letter paper (8.5 in. x 11 in.) and 
% side margins as above
\raggedbottom

% The following statement specifies the amount of space between
% paragraphs. Other reasonable specifications are \bigskipamount and \smallskipamount.
\setlength{\parskip}{\medskipamount}

% The following statement controls the line spacing.  The default
% spacing corresponds to good typographic conventions and only slight
% changes (e.g., perhaps "1.2"), if any, should be made.
\renewcommand{\baselinestretch}{1} % this is the default line space setting

% By default, each chapter will start on a recto (right-hand side)
% page.  We also force each section of the front pages to start on 
% a recto page by inserting \cleardoublepage commands.
% In many cases, this will require that the verso page be
% blank and, while it should be counted, a page number should not be
% printed.  The following statements ensure a page number is not
% printed on an otherwise blank verso page.
\let\origdoublepage\cleardoublepage
\newcommand{\clearemptydoublepage}{%
  \clearpage{\pagestyle{empty}\origdoublepage}}
\let\cleardoublepage\clearemptydoublepage

%======================================================================
%   L O G I C A L    D O C U M E N T
%======================================================================
\begin{document}

%----------------------------------------------------------------------
% FRONT MATERIAL
%----------------------------------------------------------------------
\input{frontpgs}

%----------------------------------------------------------------------
% MAIN BODY
%----------------------------------------------------------------------
\input{introduction}
\input{background}
\input{generic-types}
\input{resolution-heuristics}
\input{type-environment}
\input{experiments}
\input{conclusion}

% B I B L I O G R A P H Y
% -----------------------

% The following statement selects the style to use for references.  It controls the sort order of the entries in the bibliography and also the formatting for the in-text labels.
\bibliographystyle{plain}
% This specifies the location of the file containing the bibliographic information.  
% It assumes you're using BibTeX (if not, why not?).
\cleardoublepage % This is needed if the book class is used, to place the anchor in the correct page,
                 % because the bibliography will start on its own page.
                 % Use \clearpage instead if the document class uses the "oneside" argument
\phantomsection  % With hyperref package, enables hyperlinking from the table of contents to bibliography             
% The following statement causes the title "References" to be used for the bibliography section:
\renewcommand*{\bibname}{References}

% Add the References to the Table of Contents
\addcontentsline{toc}{chapter}{\textbf{References}}

\bibliography{pl}
% Tip 5: You can create multiple .bib files to organize your references. 
% Just list them all in the \bibliogaphy command, separated by commas (no spaces).

% The following statement causes the specified references to be added to the bibliography% even if they were not 
% cited in the text. The asterisk is a wildcard that causes all entries in the bibliographic database to be included (optional).
% \nocite{*}

\end{document}