% \usepackage[pdftex,pagebackref=false]{hyperref} % with basic options

\usepackage[pagebackref=false]{hyperref} % with basic options
		% N.B. pagebackref=true provides links back from the References to the body text. This can cause trouble for printing.
\hypersetup{
    plainpages=false,       % needed if Roman numbers in frontpages
    unicode=false,          % non-Latin characters in Acrobat’s bookmarks
    pdftoolbar=true,        % show Acrobat’s toolbar?
    pdfmenubar=true,        % show Acrobat’s menu?
    pdffitwindow=false,     % window fit to page when opened
    pdfstartview={FitH},    % fits the width of the page to the window
    pdftitle={uWaterloo\ LaTeX\ Thesis\ Template},    % title: CHANGE THIS TEXT!
%    pdfauthor={Author},    % author: CHANGE THIS TEXT! and uncomment this line
%    pdfsubject={Subject},  % subject: CHANGE THIS TEXT! and uncomment this line
%    pdfkeywords={keyword1} {key2} {key3}, % list of keywords, and uncomment this line if desired
    pdfnewwindow=true,      % links in new window
    colorlinks=true,        % false: boxed links; true: colored links
    linkcolor=blue,         % color of internal links
    citecolor=green,        % color of links to bibliography
    filecolor=magenta,      % color of file links
    urlcolor=cyan           % color of external links
}
\ifthenelse{\boolean{PrintVersion}}{   % for improved print quality, change some hyperref options
\hypersetup{	% override some previously defined hyperref options
%    colorlinks,%
    citecolor=black,%
    filecolor=black,%
    linkcolor=black,%
    urlcolor=black}
}{} % end of ifthenelse (no else)

% from uw template
% Exception to the rule of hyperref being the last add-on package
\usepackage[automake,toc,abbreviations]{glossaries-extra} 

% Setting up the page margins...
% uWaterloo thesis requirements specify a minimum of 1 inch (72pt) margin at the
% top, bottom, and outside page edges and a 1.125 in. (81pt) gutter
% margin (on binding side). While this is not an issue for electronic
% viewing, a PDF may be printed, and so we have the same page layout for
% both printed and electronic versions, we leave the gutter margin in.
% Set margins to minimum permitted by uWaterloo thesis regulations:
\setlength{\marginparwidth}{0pt} % width of margin notes
% N.B. If margin notes are used, you must adjust \textwidth, \marginparwidth
% and \marginparsep so that the space left between the margin notes and page
% edge is less than 15 mm (0.6 in.)
\setlength{\marginparsep}{0pt} % width of space between body text and margin notes
\setlength{\evensidemargin}{0.125in} % Adds 1/8 in. to binding side of all 
% even-numbered pages when the "twoside" printing option is selected
\setlength{\oddsidemargin}{0.125in} % Adds 1/8 in. to the left of all pages
% when "oneside" printing is selected, and to the left of all odd-numbered
% pages when "twoside" printing is selected
\setlength{\textwidth}{6.375in} % assuming US letter paper (8.5 in. x 11 in.) and 
% side margins as above
\raggedbottom

% The following statement specifies the amount of space between
% paragraphs. Other reasonable specifications are \bigskipamount and \smallskipamount.
\setlength{\parskip}{\medskipamount}

% Peter's fix.  UW being broken.
\setlength{\textheight}{9in}
\setlength{\topmargin}{-0.45in}
\setlength{\headsep}{0.25in}

% The following statement controls the line spacing.  The default
% spacing corresponds to good typographic conventions and only slight
% changes (e.g., perhaps "1.2"), if any, should be made.
\renewcommand{\baselinestretch}{1} % this is the default line space setting

% By default, each chapter will start on a recto (right-hand side)
% page.  We also force each section of the front pages to start on 
% a recto page by inserting \cleardoublepage commands.
% In many cases, this will require that the verso page be
% blank and, while it should be counted, a page number should not be
% printed.  The following statements ensure a page number is not
% printed on an otherwise blank verso page.
\let\origdoublepage\cleardoublepage
\newcommand{\clearemptydoublepage}{%
  \clearpage{\pagestyle{empty}\origdoublepage}}
\let\cleardoublepage\clearemptydoublepage
